0 50 100 150 200 250 300 0

10

20

30

40

50

60

2,10,3_30,4,10

3,4,2

SGI R4k assembly libblas_mips2_serial.a

naive

Square matrix size

MFLOPS/s

Performance on Indigo R4000, single prec.